LIBRARY XTST
DESCRIPTION "X11R6 XFree86 3.3 libXTST.dll for OS/2 EMX09C VERSION=6.3"
CODE	
	PRELOAD
DATA	
	MULTIPLE NONSHARED
STACKSIZE 32768
EXPORTS
	XTestCompareCurrentCursorWithWindow  @ 1
	XTestCompareCursorWithWindow  @ 2
	XTestDiscard  @ 3
	XTestFakeButtonEvent  @ 4
	XTestFakeDeviceButtonEvent  @ 5
	XTestFakeDeviceKeyEvent  @ 6
	XTestFakeDeviceMotionEvent  @ 7
	XTestFakeKeyEvent  @ 8
	XTestFakeMotionEvent  @ 9
	XTestFakeProximityEvent  @ 10
	XTestFakeRelativeMotionEvent  @ 11
	XTestGrabControl  @ 12
	XTestQueryExtension  @ 13
	XTestSetGContextOfGC  @ 14
	XTestSetVisualIDOfVisual  @ 15
	XRecordIdBaseMask @ 16
	XRecordQueryVersion @ 17
	XRecordCreateContext @ 18
	XRecordAllocRange @ 19
	XRecordRegisterClients @ 20
	XRecordUnregisterClients @ 21
	XRecordGetContext @ 22
	XRecordFreeState @ 23
	XRecordFreeData @ 24
	XRecordEnableContext @ 25
	XRecordEnableContextAsync @ 26
	XRecordProcessReplies @ 27
	XRecordDisableContext @ 28
	XRecordFreeContext @ 29
